0 5 10 15 20 25 30 35 40 45

0 5 10 15 20 25 30 35 40 45 50

128 (Forall)

128 (Pdo)

256 (Forall)

256 (Pdo)

512 (Forall)

512 (Pdo)

1536 1280 1024 768 512 256 128 64 milliseconds

Grayscale values (G)

Input size (NxN)